-- 사용자 의견(피드백) 테이블
-- 각 화면에서 사용자가 남긴 의견 + 자동수집 맥락(화면·계정·지자체) + 스크린샷 경로 저장.
CREATE TABLE IF NOT EXISTS feedback (
  fb_idx        INT AUTO_INCREMENT PRIMARY KEY,
  fb_lg_idx     INT NULL,
  fb_mb_idx     INT NULL,
  fb_mb_name    VARCHAR(100) NULL,
  fb_mb_level   INT NULL,
  fb_content    TEXT NOT NULL,
  fb_page_url   VARCHAR(255) NULL,
  fb_page_title VARCHAR(255) NULL,
  fb_screenshot VARCHAR(255) NULL,
  fb_user_agent VARCHAR(255) NULL,
  fb_status     VARCHAR(20) NOT NULL DEFAULT 'new',
  fb_admin_memo TEXT NULL,
  fb_regdate    DATETIME NULL,
  fb_updated    DATETIME NULL,
  INDEX idx_fb_lg (fb_lg_idx),
  INDEX idx_fb_status (fb_status),
  INDEX idx_fb_regdate (fb_regdate)
) ENGINE=InnoDB DEFAULT CHARSET=utf8mb4 COLLATE=utf8mb4_general_ci;
